From 804f13402078a025924f5a42c479dd418f985112 Mon Sep 17 00:00:00 2001
From: HampusM <hampus@hampusmat.com>
Date: Mon, 23 May 2022 15:30:53 +0200
Subject: feat(master): add display single minion temperature reading

---
 master/src/views/AboutView.vue | 5 -----
 1 file changed, 5 deletions(-)
 delete mode 100644 master/src/views/AboutView.vue

(limited to 'master/src/views/AboutView.vue')

diff --git a/master/src/views/AboutView.vue b/master/src/views/AboutView.vue
deleted file mode 100644
index 3fa2807..0000000
--- a/master/src/views/AboutView.vue
+++ /dev/null
@@ -1,5 +0,0 @@
-<template>
-  <div class="about">
-    <h1>This is an about page</h1>
-  </div>
-</template>
-- 
cgit v1.2.3-18-g5258

