From 804f13402078a025924f5a42c479dd418f985112 Mon Sep 17 00:00:00 2001
From: HampusM <hampus@hampusmat.com>
Date: Mon, 23 May 2022 15:30:53 +0200
Subject: feat(master): add display single minion temperature reading

---
 master/src/App.vue | 29 +++++++----------------------
 1 file changed, 7 insertions(+), 22 deletions(-)

(limited to 'master/src/App.vue')

diff --git a/master/src/App.vue b/master/src/App.vue
index ec98c47..1638c18 100644
--- a/master/src/App.vue
+++ b/master/src/App.vue
@@ -1,30 +1,15 @@
 <template>
-  <nav>
-    <router-link to="/">Home</router-link> |
-    <router-link to="/about">About</router-link>
-  </nav>
-  <router-view/>
+	<router-view />
 </template>
 
 <style lang="scss">
+@use "scss/colors";
+@use "scss/fonts";
+
 #app {
-  font-family: Avenir, Helvetica, Arial, sans-serif;
-  -webkit-font-smoothing: antialiased;
-  -moz-osx-font-smoothing: grayscale;
-  text-align: center;
-  color: #2c3e50;
+    color: colors.$text;
+    background-color: colors.$background;
+    font-family: fonts.$primary;
 }
 
-nav {
-  padding: 30px;
-
-  a {
-    font-weight: bold;
-    color: #2c3e50;
-
-    &.router-link-exact-active {
-      color: #42b983;
-    }
-  }
-}
 </style>
-- 
cgit v1.2.3-18-g5258

