From b183160763955596dbdf179524b75fc10ab2a03c Mon Sep 17 00:00:00 2001
From: HampusM <hampus@hampusmat.com>
Date: Sun, 23 May 2021 21:53:08 +0200
Subject: Frontend used Vue.js & Added ESLint

---
 src/App.vue | 11 +++++++++++
 1 file changed, 11 insertions(+)
 create mode 100644 src/App.vue

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
new file mode 100644
index 0000000..cbdce56
--- /dev/null
+++ b/src/App.vue
@@ -0,0 +1,11 @@
+<template>
+	<div id="container" class="container-fluid px-0">
+		<router-view/>
+	</div>
+</template>
+
+<script>
+export default {
+	name: "App"
+}
+</script>
\ No newline at end of file
-- 
cgit v1.2.3-18-g5258

